
\def\V{{\bf v}}
\def\ave#1{\overline{#1}}
\def\mave#1{\tilde{#1}}
\def\q{c}

\begin{frame}
 \frametitle{Extension of mass flux schemes to cumulus clouds}


\centerline{\includegraphics[bb=30 330 700 510, clip,width=0.8\textwidth]{gcm6.pdf}}

{\small
\begin{itemize}
\item
Computation of condensation in the ascending plume
\item
Additional heating by condensation within the updraft\\
Feedback on the mass flux $f$ and transport
\item
Computation of the water PDF
\end{itemize}
}
\centerline{\includegraphics[bb=-200 100 750 520,width=1.\textwidth]{gcm5.pdf}}


\end{frame}
