
\def\V{{\bf v}}
\def\ave#1{\overline{#1}}
\def\mave#1{\tilde{#1}}
\def\q{c}

\begin{frame}
 \frametitle{1D test of the cloudy thermal plume model}

\begin{columns}

\column{0.55\textwidth}
{\small
Continental diurnal cycle with cumulus\\
ARM EUROCS case (US Oklahoma)\\
 Rio et al. 2008}

\column{0.45\textwidth}
\includegraphics[bb=0 10 500 180, clip,width=\textwidth]{gcm20.pdf}

\end{columns}

\centerline{\includegraphics[bb=30 0 700 400, clip,width=0.8\textwidth]{EurocsCu.pdf}}


\end{frame}
