
\def\V{{\bf v}}
\def\ave#1{\overline{#1}}
\def\mave#1{\tilde{#1}}
\def\q{c}

\begin{frame}
 \frametitle{Statistical cloud schemes}


\centerline{\includegraphics[bb=30 300 700 510, clip,width=0.8\textwidth]{gcm11.pdf}}

By analogy with a nozzle above a wall of height $h$.

{\color{red} Avaliable Lifting Energy} for the convection\\
Scaling with $w^2$.\\
Trigerring : ALE > |CIN|

{\color{red} Avaliable Lifting Power} for the convection\\
Scaling with $w^3$.\\
Closure : Mass flux at convection base = f (ALP)


\centerline{\includegraphics[bb=-200 100 750 540, clip,width=1.\textwidth]{gcm10.pdf}}


\end{frame}
