
\def\V{{\bf v}}
\def\ave#1{\overline{#1}}
\def\mave#1{\tilde{#1}}
\def\q{c}

\begin{frame}
 \frametitle{ALP closure}




\medskip
{\color{red} Avaliable Lifting Energy} for the convection\\
Scaling with $w^2$.\\
Trigerring : ALE > |CIN|

\medskip
{\color{red} Avaliable Lifting Power} for the convection\\
Scaling with $w^3$.\\
Closure : M$_B$ = f (ALP)

\medskip
{\bf New requirements for the boundary layer scheme :}\\
give reasonable estimates of $\ave{{w'}^2}$ and $\ave{{w'}^3}$.
\end{frame}
