# $HeadURL: svn://forge.ipsl.fr/orchidee/trunk/ORCHIDEE_OL/FG_CRUJRA_OD_HIST/PARAM/run.def $
# $Date: 2020-03-06 15:58:54 +0100 (ven. 06 mars 2020) $
# $Revision: 6616 $
#
INCLUDEDEF=orchidee.def
INCLUDEDEF=orchidee_pft.def

# Parameters of the driver differ between the coupled and off-line configs
#**************************************************************************
# Time length for one intergration 
# (default full lenght of forcing file)
TIME_LENGTH = _AUTO_

# Time in the forcing file at which the model start if start date is
# not set by the forcing file 
# (default 0)
TIME_SKIP = _AUTO_

# If DRIVER_reset_time=y, read the year from forcing file instead of
# taking it from restart file (default n)
DRIVER_reset_time = _AUTO_

# Name of restart file for the driver (default NONE)
RESTART_FILEIN = _AUTOBLOCKER_

# Value for atmospheric CO2 could be interactive (LMDz), a time series or fixed
# (default=350)
ATM_CO2 = _AUTO_: DEFAULT = 350.

# Off-line configurations could be run for a smaller domain
# (default no limits are set, the full domain on the forcing file is used)
#**************************************************************************
#LIMIT_WEST=8
#LIMIT_NORTH=48
#LIMIT_SOUTH=46
#LIMIT_EAST=10



