The equation to calculate tree crown area from its diameter:
\begin{equation}
CA=k_{allom1}*Diameter^{k_{rp}}
\end{equation}
Where $CA$ is tree crown area, $Diameter$ is tree diameter, $k_{allom1}$ and $k_{rp}$ are parameters.
