\begin{equation}
T_{crit}   = a\cdot T^{2}+b\cdot T+c
\end{equation}
where $T_{crit}$ is the critical temperature for senescence, $T$ is 
the long term annual mean temperature and $a$,$b$ and $c$ are PFT-dependent 
empirical parameters.
