 10.00000      H: atmospheric scale height (km) (used as a reference only)
  0.00500016264   Typical log(sigma) for 1st layer (z=H*log(sigma))
  0.0198207167   Typical log(sigma) for 2nd layer, etc...
  0.0790814403
  0.212424006
  0.449459739
  0.819828957
  1.35316208
  2.07908899
  3.02724212
  4.22724098
  5.70872605
  7.50131905
  9.63465035
  12.13835
  15.0420499
  18.37538
  21.7087102
  25.0420403
  28.3753705
  31.7087007
  35.0420308
  38.375361
  41.7086935
  45.0420237
  48.3753538
  51.708684
  55.0420141
  58.3753443
  61.7086744
  65.0420046
  68.3753347
  71.7086649
  75.041995
  78.3753252
  81.7086601
  85.0419903
  88.37533
  91.7086601
  95.0419998
  98.37533
  101.70867
  105.042
  108.37534
  111.70867
  115.042009
  118.37534
  124.375343
  130.375338
  138.875341
  147.375336
